program1.exe +RTS -hb (null) 4,032,660 bytes x seconds Mon May 05 11:55 2014

seconds

0.0 0.1 0.1 0.2 0.2 0.3 bytes

0M

5M

10M

15M

20M

25M

DRAG

USE

VOID