IEEE Power Electronics Society Fifth Workshop on Computers in Power Electronics Portland State University, Portland, Oregon, USA

The 5th IEEE Power Electronics Society Workshop on Computers in Power Electronics will be held August 11-14, 1996, on the campus of Portland State University (PSU), Portland, Oregon. Early arrival on Saturday (Aug. 10) is encouraged to take advantage of airfare discounts.

Registration Information

The workshop registration fee covers participation in all technical activities including the tutorial session, copy of speakers’ viewgraphs, the workshop proceedings, the reception, river boat banquet, and 3 breakfasts (Aug. 12–14). Dormitory style accommodations are available on PSU Campus, the site of the workshop. The fee for these accommodations covers a package of five nights from Aug. 10 (Saturday) to Aug. 14 (Wednesday). The number of rooms is limited to 14 (double occupancy only) and they will be assigned on a first-come-first-served basis. Total cost is US$75 for the package. The availability should be checked before registering by contacting the Workshop Chair by phone, e-mail or fax. Alternative lodging has been arranged at Red Lion Inn, which is only a short walking distance away from the workshop site. A number of rooms has been reserved for workshop participants. For reservations and information contact Red Lion Inn directly by phone: (503) 221–0450, or fax: (503) 225–4303. The per night conference rates are: Single occupancy room: US$85.00, Double occupancy: US$100, Triple occupancy: US$115.00, and Quadruple occupancy: US$130.00. PSU on-campus parking can be arranged through the PSU parking office by phone: (503) 725–3442. Parking is free in PSU parking structures on Saturday and Sunday.

PSU is easily accessed from the Portland Airport via shuttle services, buses and taxi service. Detailed instructions, workshop program, and information on Portland and its surroundings will be sent to participants after registration.

Please submit fees to the Workshop Chair by check payable to the IEEE 96 COMP. PELS, accompanied by the provided registration form. International participants should pay by International Money Order or Cashier’s check drawn on a U.S. bank.

Additional information can be obtained on-line via world-wide-web: conference site can be accessed by URL http://www.ee.pdx.edu/~brano/pels96 . The site also contains most up to date information. Links to it can also be found in IEEE listing of conferences at http://www.ieee.org/conference/conflinks.html .

Richard Tymerski, Workshop Chair E.E. Dept., Portland State University P.O. Box 751, Portland, OR 97207-0751, USA tel: 503–725–5424, fax: 503–725–3807, e-mail: tymerski@ee.pdx.edu

IEEE 96 Workshop on Computers in Power Electronics Registration Form

Workshop participant Name: Address:

Country: Tel: Fax: e-mail: Workshop registration

IEEE Member: US$240 US$ Non-member: US$290 US$ After June 30, 1996, IEEE Member: US$300 US$ After June 30, 1996, non-Member: US$350 US$ On-campus Accommodation

Five nights package, Aug. 10-14 (Sat.-Wed.): US$75 (total) US$ If you have a roommate preference, please provide their name

Additional banquet tickets

Banquets tickets for guests: US$40 US$

Total: US$

The total amount must be paid in full in U.S. dollars by check or money order, payable to “IEEE 96 Comp. PELS.” International participants should also pay in U.S. dollars and use International Money Orders or Cashier’s checks drawn on U.S. banks. Other types of payment will not be accepted.